ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

1.0 1.1 1.2 1.3

32.0

34.0

36.0

38.0

40.0

42.0

44.0

46.0

2 Cal + 3 Fo + 1 Spl + 2 CO_2 + 4 H_2O

2 Dol + 1 Cchl

ACMS-1

Δ^*H = + 576.455 kJ Δ^*S = + 991.017 J/K

CB

CB

CB CB CB CB CB CB CB

CB

CB CB

CB

o[ C ]

600 550

700 650