ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

1.0 1.1 1.2 1.3

73.0

76.0

79.0

82.0

85.0

88.0

91.0

94.0

97.0

100.0

103.0

106.0

109.0

112.0

2 Di + 5 Fo + 3 Spl + 2 CO_2 + 12 H_2O

2 Cal + 3 Cchl

ACMS-2

Δ^*H = + 1301.486 kJ Δ^*S = + 2227.010 J/K

CB

CB CB CB CB

CB

CB CB CB CB CB CB

CB

CB CB CB

CB

CB CB

CB

CB CB

o[ C ]

600 550

700 650