ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

1.1 1.2 1.3 1.4 1.5 1.6

105.0

109.0

113.0

117.0

121.0

125.0

129.0

133.0

137.0

141.0

145.0

149.0

22 An + 8 Di + 23 Wo + 18 H_2O

34 Qtz + 4 Ves

ACMS-7

Δ^*H = + 2760.921 kJ Δ^*S = + 4824.312 J/K

O

O

O

H

H

H

H

H

H

H H

H

H

H

H

H H

o[ C ] 400 500 450 600