ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

1.3 1.4 1.5 1.6 1.7 1.8

250.0

260.0

270.0

280.0

290.0

300.0

310.0

320.0

330.0

340.0

350.0

360.0

370.0

380.0

390.0

400.0

410.0

29 Czo + 14 Grs + 5 Cchl + 6 Qtz + 53 H_2O

25 Pmp

ACMS-8

Δ^*H = + 3810.207 kJ Δ^*S = + 8852.601 J/K

SL

SL

SL

SL SL SL SL SL SL SL SL SL SL SL

SL SL SL

SL SL SL SL SL SL

SL

HS HS

HS

HS

HS

HS HS HS HS HS

o[ C ]

400 350