ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

1.0 1.1 1.2 1.3 1.4 1.5 1.6 1.7

42.0

45.0

48.0

51.0

54.0

57.0

60.0

63.0

66.0

69.0

72.0

75.0

78.0

1 Ky + 1 Qtz + 2 Zo + 7 H_2O

4 Lws

ACS-26

Δ^*H = + 482.408 kJ Δ^*S = + 1117.441 J/K

C

C C

C C

NK NK NK

NK NK

NK NK

NK NK

N N N

N N

N N N

SP SP SP SP SP

SP SP SP

SP SP SP SP

o[ C ] 400 500 600 700