ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

0.6 0.7 0.8 0.9 1.0

-1.0 0.0 1.0 2.0 3.0 4.0 5.0 6.0 7.0 8.0 9.0 10.0

2 An + 2 Gh + 3 Wo

4 Grs

ACS-30

Δ^*H = + 315.648 kJ Δ^*S = + 279.832 J/K

B B B

S S H H H

H H

H H

H H H

H H

H H

H H

H H

H

H H

H

o[ C ] 800 900 1100

1300