ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

0.9 1.0 1.1 1.2 1.3 1.4 1.5 1.6 0.0

1.0

2.0

3.0

4.0

5.0

6.0

7.0

8.0

3 An + 1 Cal + 1 H_2O

2 Zo + 1 CO_2

ACS-35

Δ^*H = + 35.613 kJ

Δ^*S = + 69.474 J/K

JZ JZ

S

S S

S

S

S S S S

S

S S

S

AF

AF AF AF AF AF AF

AF AF

AF AF

AF AF AF

AF AF

AF

AF

AF

SN

SN

SN

SN SN

SN SNSN SN SN SN SN SN

o[ C ] 400 500 600 700