ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

0.8 0.9 1.0 1.1 1.2 1.3 4.0

6.0

8.0

10.0

12.0

14.0

16.0

18.0

20.0

2 Grs + 2 CO_2

2 An + 2 Cal + 1 Wo

ACS-36

Δ^*H = + 88.666 kJ Δ^*S = + 197.464 J/K

Z Z

Z

Z

Z

GG

GG

GG

GG GG

GG GG GG GG GG

GG

GG

G

H H H H H

S S

S S

S

S

S

S

S

S S S

S S

S

o[ C ] 600 700 800