ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

0.8 0.9 1.0 1.1

18.0

19.0

20.0

21.0

22.0

23.0

24.0

2 Gh + 3 CO_2

1 An + 3 Cal + 1 Crn

ACS-41

Δ^*H = + 390.109 kJ Δ^*S = + 537.280 J/K

S S

S S

H

H

H

H

H

H

o[ C ] 700 800 900