ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

0.8 0.9 1.0 1.1 1.2 1.3 1.4 1.5

19.0

21.0

23.0

25.0

27.0

29.0

31.0

33.0

35.0

6 An + 2 Grs + 1 Crn + 3 H_2O

6 Zo

ACS-45

Δ^*H = + 298.375 kJ Δ^*S = + 543.367 J/K

C C

C C

C C

N N

NN N N N

N N

N N

N N

N N

N N

B B B B

B

o[ C ] 500 600 700 900