ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

1.3 1.4 1.5 1.6 1.7 1.8 9.0

10.0

11.0

12.0

13.0

1 An + 2 Qtz + 2 H_2O

1 Wrk

ACS-60

Δ^*H = + 109.535 kJ Δ^*S = + 258.868 J/K KR

L

L

L L

L L L L L

L L L

L L L

o[ C ]

400 350