ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

0.7 0.8 0.9 1.0 1.1

29.0

30.0

31.0

32.0

33.0

34.0

35.0

36.0

37.0

38.0

39.0

1 En + 1 Fo + 1 Spl + 4 H_2O

1 Cchl

AMS-29

Δ^*H = + 383.103 kJ Δ^*S = + 635.180 J/K

JC JC JC

JC JC JC JC JC

SS SS

SS SS SS SS SS SS SS SS SS

FY FY

FY FY FY FY FY

FY

FY FY FY

J J JJ J J J

J J J J

o[ C ] 700 800 900 1100