ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

1.0 1.1 1.2 1.3 1.4

91.0

94.0

97.0

100.0

103.0

106.0

109.0

112.0

115.0

118.0

121.0

124.0

127.0

130.0

3 Crd + 8 Tlc + 16 H_2O

6 Cchl + 29 Qtz

AMS-30

Δ^*H = + 1364.606 kJ Δ^*S = + 2550.900 J/K

C C C C C

C

C C C

C C C

C C

C C

C

FF FF

FF

FF FF FF FF

FY FY

FY

FY FY FY FY FY

FY FY

o[ C ] 500 600 550 700