ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

0.9 1.0 1.1 1.2

124.0

127.0

130.0

133.0

136.0

139.0

142.0

145.0

148.0

151.0

154.0

157.0

160.0

1 Crd + 10 Fo + 3 Spl + 20 H_2O

5 Cchl

AMS-31

Δ^*H = + 1929.458 kJ Δ^*S = + 3229.029 J/K

C

C

C C

C C

C C

FY FY

FY FY

M M MM M

M M M M M

M M M M M

o[ C ] 600 700 650 800