ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

0.9 1.0 1.1 1.2 1.3

50.0

52.0

54.0

56.0

58.0

60.0

62.0

64.0

66.0

1 Crd + 7 Fo + 8 H_2O

3 En + 2 Cchl

AMS-32

Δ^*H = + 780.150 kJ Δ^*S = + 1323.487 J/K

JC JC JC JC

JC JC JC JC

JC

JC JC JC JC JC

JC

JC JC JC

o[ C ] 600 700 800