ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

1.2 1.3 1.4 1.5

95.0

97.0

99.0

101.0

103.0

105.0

107.0

109.0

111.0

113.0

115.0

117.0

119.0

121.0

5 Crd + 13 Qtz + 16 H_2O

2 Cchl + 8 Prl

AMS-37

Δ^*H = + 1398.092 kJ Δ^*S = + 2825.003 J/K

SS

SS

SS

SS

SS

SS

o[ C ]

500 450