ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

0.7 0.8 0.9 1.0 1.1 1.2

27.0

29.0

31.0

33.0

35.0

37.0

39.0

41.0

43.0

45.0

47.0

1 Spr + 4 H_2O

1 Cchl + 6 Crn + 2 Spl

AMS-42

Δ^*H = + 524.382 kJ Δ^*S = + 802.251 J/K

AS AS AS AS AS AS AS AS AS AS AS AS

AS AS AS AS AS AS AS AS

S S S S S S S S S

S S

S S S

S

o[ C ] 700 800 1000