ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

0.9 1.0 1.1

860.0

870.0

880.0

890.0

900.0

910.0

920.0

930.0

940.0

950.0

960.0

970.0

980.0

990.0

1000.0

1010.0

1020.0

1030.0

6 Crd + 19 Spr + 116 H_2O

29 Cchl + 154 Crn

AMS-44

Δ^*H = +14137.681 kJ Δ^*S = +22029.064 J/K S S

S S

S S

S S S

S

S S

o[ C ] 700 800 750