ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

0.6 0.7 0.8 0.9 1.0 1.1

-4.0

-3.0

-2.0

-1.0 0.0 1.0 2.0 3.0 4.0 5.0 6.0 7.0 8.0

1 En + 1 Spr

1 Crd + 7 Spl

AMS-49

Δ^*H = + 88.374 kJ Δ^*S = + 96.585 J/K

S

S

S

S

S

S

S S

S

S

S

S S

S S S

o[ C ] 800 1000

1200