ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

0.5 0.6 0.7 0.8

-15.0

-11.0

-7.0

-3.0 1.0 5.0 9.0 13.0

17.0

21.0

25.0

29 Mul + 4 Spr

14 Crd + 95 Crn

AMS-50

Δ^*H = + 2532.762 kJ Δ^*S = + 1671.025 J/K

S S

S S

S

S S

S

S

S

S S

o[ C ]

1100

1300

1500

1700