ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

1.0 1.1 1.2 1.3

53.0

55.0

57.0

59.0

61.0

63.0

65.0

67.0

69.0

71.0

73.0

75.0

5 Crd + 11 Crn + 8 H_2O

19 And + 2 Cchl

AMS-8

Δ^*H = + 825.945 kJ Δ^*S = + 1515.252 J/K

S S

S S S S

S S S

S S

S S

S S S

S

o[ C ]

600 550

700 650