ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

0.9 1.1 1.3 1.5 1.7 4.0

5.0

6.0

7.0

8.0

9.0

10.0

11.0

12.0

1 Crn + 1 H_2O

2 Dsp

AS-12

Δ^*H = + 81.140 kJ Δ^*S = + 168.960 J/K

FH

H H H H

H

H FG FG FG FG

M

M

M M

M

M

M

M

FF F F F F

F

F F

F F

F F F

F F

o[ C ] 400 500 600 800