ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

1.0 1.1 1.2 1.3

47.0

49.0

51.0

53.0

55.0

57.0

59.0

61.0

63.0

65.0

67.0

11 Di + 2 Fo + 5 CO_2 + 3 H_2O

5 Cal + 3 Tr

CMS-10

Δ^*H = + 704.881 kJ Δ^*S = + 1289.874 J/K

R

R R

R R R

R R R R R

R R R R

R R

R R R

R

R R R R R R

R R

R R R R R

CB

CB CB

CB CB

CB CB

CB

CB

o[ C ]

600 550

700 650