ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

0.8 0.9 1.0 1.1 1.2 9.0

10.0

11.0

12.0

13.0

14.0

15.0

16.0

4 Di + 5 En + 2 H_2O

2 Fo + 2 Tr

CMS-15

Δ^*H = + 216.291 kJ Δ^*S = + 324.135 J/K

SM SM SM SM SM SM

SM SM SM J J J J J J J J J J

J

J

J J J

J J

J J J J J

J J J J

J J J

o[ C ]

700 650 800 900