ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

0.7 0.8 0.9 1.0 1.1 1.2 3.0

4.0

5.0

6.0

7.0

8.0

9.0

10.0

11.0

1 Cal + 1 Per + 1 CO_2

1 Dol

CMS-17

Δ^*H = + 123.918 kJ Δ^*S = + 176.816 J/K

HT HT

HT HT HT HT HT

HT HT HT

HT HT

HT HT

HT HT

HT HT

GG GG

GG GG

GG

GG GG GG

GG GG GG

GG GG

GH

GH

GH

o[ C ] 700 800 1000