ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

0.9 1.0 1.1 1.2 6.0 7.0 8.0 9.0 10.0

11.0

12.0

13.0

14.0

15.0

16.0

1 Wo + 2 Mtc + 2 CO_2

2 Cal + 2 Di

CMS-23

Δ^*H = + 259.099 kJ

Δ^*S = + 338.720 J/K

ZH ZH

ZH ZH ZH

ZH ZH ZH

ZH ZH ZH

ZH ZH ZH

ZH ZH ZH

ZH ZH ZH

o[ C ] 600 700 650 800