ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

0.8 0.9 1.0 1.1 1.2

-2.0

-1.0

0.0

1.0

2.0

3.0

2 Ak

2 Mtc + 1 Wo

CMS-29

Δ^*H = + 41.173 kJ Δ^*S = + 45.028 J/K

Y Y

Y

Y

Y Y Y Y

HT

HT HT HT HT HT HT HT HT HT HT HT HT

HT HT HT ZH ZH ZH ZH

o[ C ]

700 650 800 900