ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

0.6 0.7 0.8 0.9 1.0 1.1 4.0

5.0

6.0

7.0

8.0

9.0

10.0

1 Ak + 1 CO_2

1 Cal + 1 Di

CMS-33

Δ^*H = + 150.136 kJ Δ^*S = + 191.874 J/K

W W

W W W

W W

W

W

W

W W

W W

W

W W

Y Y Y Y Y Y

ZSB

ZSB

ZSB ZSB

ZSB

ZH

ZH

ZH

ZH ZH ZH ZH

ZH

o[ C ] 800 1000

1200