ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

0.5 0.6 0.7 0.8 0.9 1.0 1.1 1.2

-570.0

-540.0

-510.0

-480.0

-450.0

-420.0

-390.0

-360.0

-330.0

-300.0

-270.0

-240.0

-210.0

10 O_2 + 19 Fe

20 Wus

F-1 Δ^*H = + 5283.261 kJ Δ^*S = + 1390.159 J/K

ME ME ME ME ME ME ME ME ME ME ME ME ME ME ME ME ME ME ME ME ME ME

ME ME ME ME ME

ME

OP

OP

OP

OP

OP

OP

OP OP

o[ C ] 700 900 1200

1600