ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

0.5 0.6 0.7 0.8 0.9 1.0 1.1 1.2

-38.0

-35.0

-32.0

-29.0

-26.0

-23.0

-20.0

-17.0

-14.0

-11.0

-8.0

-5.0

4 Mag + 1 O_2

6 Hem

F-3 Δ^*H = + 491.375 kJ Δ^*S = + 265.307 J/K ME ME ME ME ME ME ME ME ME

C

C C

C C

C

C

C C

o[ C ] 700 900 1200

1600