ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

1.1 1.2 1.3 1.4

16.0

17.0

18.0

19.0

20.0

21.0

1 St + 1 Qtz + 3 H_2O

4 Cld + 5 Sil

FAS-8

Δ^*H = + 218.799 kJ Δ^*S = + 437.349 J/K

R

R

R

R

R

R R R

R

o[ C ] 500 600 550