ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

0.8 0.9 1.0 1.1 1.2 1.3

-4.0

-3.0

-2.0

-1.0

0.0

1.0

2.0

3.0

4 Hd + 1 Wo + 2 NiO

2 Adr + 4 Qtz + 2 Ni

FCS-1

Δ^*H = + 66.585 kJ Δ^*S = + 75.786 J/K

LL L L

L L L L L L

L L L

L L LL

o[ C ] 600 700 800