ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

0.6 0.7 0.8 0.9 1.0 1.1 1.2

-59.0

-56.0

-53.0

-50.0

-47.0

-44.0

-41.0

-38.0

-35.0

-32.0

-29.0

1 Qtz + 2 Fe + 1 O_2

1 Fa

FS-1

Δ^*H = + 568.101 kJ Δ^*S = + 150.169 J/K ME ME ME ME

ME ME ME ME ME ME ME ME

O

O

O

O

O

O

O O

O

O

o[ C ] 700 900 1100