ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

0.9 1.0 1.1 1.2 1.3 1.4

52.0

55.0

58.0

61.0

64.0

67.0

70.0

73.0

76.0

79.0

82.0

3 Crd + 8 Sa + 8 H_2O

6 Ms + 2 Phl + 15 Qtz

KAMS-10

Δ^*H = + 894.178 kJ Δ^*S = + 1583.610 J/K

S S S S

S S S S

S S S

S S S S

S S S

o[ C ] 500 600 700 800