ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

0.9 1.0 1.1 1.2 1.3 1.4

24.0

26.0

28.0

30.0

32.0

34.0

36.0

38.0

1 Crd + 1 Phl + 4 H_2O

1 Cchl + 1 Ms + 2 Qtz

KAMS-11

Δ^*H = + 375.586 kJ Δ^*S = + 700.224 J/K

BF BF

S S S

S S

S S S

SS S S S

S

S S

S S S

o[ C ] 500 600 700 800