ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

0.9 1.0 1.1 1.2 1.3 6.0

7.0

8.0

9.0

10.0

11.0

1 Sa + 1 Sil + 1 H_2O

1 Ms + 1 Qtz

KAS-6

Δ^*H = + 111.094 kJ Δ^*S = + 188.921 J/K

CJ CJ CJ

CJ CJ CJ CJ

CJ CJ CJ CJ

CJ CJ CJ CJ CJ CJ CJ

D D D D

D D

D DD

AH

E

E

E

E

o[ C ] 600 700 800