ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

0.9 1.0 1.1 1.2

24.0

25.0

26.0

27.0

28.0

29.0

30.0

31.0

32.0

33.0

34.0

5 Ath + 4 H_2O

4 Fo + 9 Tlc

MS-16

Δ^*H = + 440.430 kJ Δ^*S = + 709.993 J/K

C C C C

C C

C C C C C C C

C C C C

G G

G G G G

G

G G

G

o[ C ] 600 700 650 800