ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

1.0 1.1 1.2 1.3 1.4 1.5 1.6

31.0

34.0

37.0

40.0

43.0

46.0

49.0

52.0

55.0

58.0

4 Fo + 5 CO_2 + 1 H_2O

5 Mgs + 1 Tlc

MS-2

Δ^*H = + 546.757 kJ Δ^*S = + 1049.342 J/K

J

J J J

J J J

J J J J

J

J J

J J

J

J J

J J J J

Gr Gr Gr Gr Gr

Gr

Gr

Gr Gr

Gr Gr

Gr

Gr

Gr

Gr

Gr Gr

Gr Gr

Gr

o[ C ] 400 500 600 700