ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

0.7 0.8 0.9 1.0 1.1 1.2 1.3 1.4 5.0

6.0

7.0

8.0

9.0

10.0

11.0

1 Per + 1 H_2O

1 Brc

MS-22

Δ^*H = + 82.084 kJ Δ^*S = + 152.529 J/K

BE

BE BE BE

BE BE BE

BE

BE BE

BE BE BE

IHW IHW IHW

S S SS

S S S

S S S

S S

F F

F

FG

P P P P PPP P P P P P P

P P P PP P P P P PP P

o[ C ] 600 700 900