ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

0.5 0.7 0.9 1.1 1.3

-53.0

-49.0

-45.0

-41.0

-37.0

-33.0

-29.0

-25.0

-21.0

-17.0

-13.0

-9.0

2 Ni + 1 O_2

2 NiO

N-1 Δ^*H = + 479.489 kJ Δ^*S = + 189.008 J/K

HS

HS

HS

HS

HS

HS

HS

HS

HS

o[ C ] 600 800 1100

1600