ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

1.1 1.2 1.3 1.4 1.5

42.0

44.0

46.0

48.0

50.0

52.0

54.0

56.0

58.0

60.0

1 Ed + 3 Cal + 7 CO_2

1 Aab + 5 Dol + 4 Qtz + 1 H_2O

NACMS-3

Δ^*H = + 464.853 kJ Δ^*S = + 1014.240 J/K W

W

W

W W

W

W W

W W

W W

W

W

W W W W

W

W

W

W

W

W

W

W

W

W

o[ C ]

500 450

600 550