ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

0.8 0.9 1.0

13.0

14.0

15.0

16.0

17.0

18.0

19.0

20.0

21.0

6 Fo + 2 Aab + 2 H_2O

2 Nphl + 3 En

NAMS-2

Δ^*H = + 261.409 kJ Δ^*S = + 364.625 J/K

CG CG CG CG

CG CG

CG CG

CG CG

o[ C ] 800 900 850