ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

0.8 0.9 1.0

24.0

25.0

26.0

27.0

28.0

29.0

3 Ne + 6 Fo + 1 Aab + 4 H_2O

4 Nphl

NAMS-3

Δ^*H = + 490.142 kJ Δ^*S = + 659.148 J/K

C C C CC C C

C

C

C C

o[ C ] 800 900 850