ln K_{red. [298 K, 0.1 MPa]}

1/T ∗ 1000 [ 1/K ]

1.0 1.1 1.2 1.3 1.4 1.5 5.0

6.0

7.0

8.0

9.0

10.0

1 Aab + 1 And + 1 H_2O

1 Pg + 1 Qtz

NAS-16

Δ^*H = + 101.617 kJ Δ^*S = + 185.575 J/K

C C C C C

C C C

C C C C C C C C C C C C C C

o[ C ]

500 450 600 700